-- Migration 002: Add battery_calibration_offset to cameras table
-- This column stores a per-camera calibration value for converting raw battery
-- readings (e.g. GoPro Hero 3 byte at offset 57) into percentage values.

ALTER TABLE cameras ADD COLUMN battery_calibration_offset REAL;
